/*
 Navicat Premium Data Transfer

 Source Server         : MySQL
 Source Server Type    : MySQL
 Source Server Version : 80033
 Source Host           : localhost:3306
 Source Schema         : 20240301_insitulaboratory

 Target Server Type    : MySQL
 Target Server Version : 80033
 File Encoding         : 65001

 Date: 11/03/2024 13:13:19
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for cavitybatterylevel
-- ----------------------------
DROP TABLE IF EXISTS `cavitybatterylevel`;
CREATE TABLE `cavitybatterylevel`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `Voltage` float NULL DEFAULT NULL COMMENT '电池电压',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavitybatterylevel
-- ----------------------------

-- ----------------------------
-- Table structure for cavityenergyconversion
-- ----------------------------
DROP TABLE IF EXISTS `cavityenergyconversion`;
CREATE TABLE `cavityenergyconversion`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `Enable1Of24V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板1 24V使能',
  `Enable1Of12V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板1 12V使能',
  `Enable2Of24V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板2 24V使能',
  `Enable2Of12V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板2 12V使能',
  `Enable3Of24V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板3 24V使能',
  `Enable3Of12V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板3 12V使能',
  `Enable4Of24V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板4 24V使能',
  `Enable4Of12V` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电能转换板4 12V使能',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityenergyconversion
-- ----------------------------

-- ----------------------------
-- Table structure for cavityenvironment
-- ----------------------------
DROP TABLE IF EXISTS `cavityenvironment`;
CREATE TABLE `cavityenvironment`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `Temperature1` float NULL DEFAULT NULL COMMENT '温度1',
  `Temperature2` float NULL DEFAULT NULL COMMENT '温度2',
  `HumDataIdNumity1` float NULL DEFAULT NULL COMMENT '湿度1',
  `HumDataIdNumity2` float NULL DEFAULT NULL COMMENT '湿度2',
  `Leak1` float NULL DEFAULT NULL COMMENT '漏水1',
  `Leak2` float NULL DEFAULT NULL COMMENT '漏水2',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityenvironment
-- ----------------------------

-- ----------------------------
-- Table structure for cavityoperationstatus
-- ----------------------------
DROP TABLE IF EXISTS `cavityoperationstatus`;
CREATE TABLE `cavityoperationstatus`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `Voltage48V1` float NULL DEFAULT NULL COMMENT '电能转换板1的48V电压',
  `Current48V1` float NULL DEFAULT NULL COMMENT '电能转换板1的48V电流',
  `Current24V1` float NULL DEFAULT NULL COMMENT '电能转换板1的24V电流',
  `Current48V2` float NULL DEFAULT NULL COMMENT '电能转换板2的48V电流',
  `Current24V2` float NULL DEFAULT NULL COMMENT '电能转换板2的24V电流',
  `Current48V3` float NULL DEFAULT NULL COMMENT '电能转换板3的48V电流',
  `Current24V3` float NULL DEFAULT NULL COMMENT '电能转换板3的24V电流',
  `Current48V4` float NULL DEFAULT NULL COMMENT '电能转换板4的48V电流',
  `Current24V4` float NULL DEFAULT NULL COMMENT '电能转换板4的24V电流',
  `LeakageCurrent1` float NULL DEFAULT NULL COMMENT '漏电流模块1',
  `LeakageCurrent2` float NULL DEFAULT NULL COMMENT '漏电流模块2',
  `LeakageCurrent3` float NULL DEFAULT NULL COMMENT '漏电流模块3',
  `LeakageCurrent4` float NULL DEFAULT NULL COMMENT '漏电流模块4',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityoperationstatus
-- ----------------------------

-- ----------------------------
-- Table structure for cavityoutputcurrent
-- ----------------------------
DROP TABLE IF EXISTS `cavityoutputcurrent`;
CREATE TABLE `cavityoutputcurrent`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `CurrentOfGC-MS` float NULL DEFAULT NULL COMMENT '色质联用输出电流',
  `CurrentOfSecondComPort1` float NULL DEFAULT NULL COMMENT '备用串口1输出电流',
  `CurrentOfSecondComPort2` float NULL DEFAULT NULL COMMENT '备用串口2输出电流',
  `CurrentOfOpticalComm` float NULL DEFAULT NULL COMMENT '光通讯机输出电流',
  `CurrentOfADCP` float NULL DEFAULT NULL COMMENT 'ADCP输出电流',
  `CurrentOfCTD` float NULL DEFAULT NULL COMMENT 'CTD输出电流',
  `CurrentOfDC-ECD` float NULL DEFAULT NULL COMMENT '气相色谱仪输出电流',
  `CurrentOfCH4` float NULL DEFAULT NULL COMMENT '甲烷同位素分析仪电流',
  `CurrentOfCo2` float NULL DEFAULT NULL COMMENT '二氧化碳同位素分析仪电流',
  `CurrentOfSNetPort` float NULL DEFAULT NULL COMMENT '备用网口输出电流',
  `CurrentOfSerialServer` float NULL DEFAULT NULL COMMENT '串口服务器输出电流',
  `CurrentOfIPC` float NULL DEFAULT NULL COMMENT '工作机输出电流',
  `CurrentOfMicroRaman` float NULL DEFAULT NULL COMMENT '显微拉曼分析仪输出电流',
  `CurrentOfMS` float NULL DEFAULT NULL COMMENT '质谱仪输出电流',
  `CurrentOfALD` float NULL DEFAULT NULL COMMENT '声学定位输出电流',
  `CurrrentOfVDataIdNumeo1` float NULL DEFAULT NULL COMMENT '摄像1的输出电流',
  `CurrentOfVDataIdNumeo2` float NULL DEFAULT NULL COMMENT '摄像2的输出电流',
  `CurrentOfSwichBoard` float NULL DEFAULT NULL COMMENT '电交换机2输出电流',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityoutputcurrent
-- ----------------------------

-- ----------------------------
-- Table structure for cavityoutputfeedback
-- ----------------------------
DROP TABLE IF EXISTS `cavityoutputfeedback`;
CREATE TABLE `cavityoutputfeedback`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `OutputFeedbackOfGC-MS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '色质联用输出反馈',
  `OutputFeedback1OfSecondComPort` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用串口1输出反馈',
  `OutputFeedback2OfSecondComPort` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用串口2输出反馈',
  `OutputFeedbackOfOpticalComm` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '光通讯机输出反馈',
  `OutputFeedbackOfADCP` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'ADCP输出反馈',
  `OutputFeedbackOfCTD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'CTD输出反馈',
  `OutputFeedbackOfDC-ECD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '气相色谱仪输出反馈',
  `OutputFeedbackOfCH4` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '甲烷同位素分析仪反馈',
  `OutputFeedbackOfCo2` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '二氧化碳同位素分析仪反馈',
  `OutputFeedbackOfSNetPort` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用网口反馈',
  `OutputFeedbackOfSerialServer` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '串口服务器反馈',
  `OutputFeedbackOfIPC` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '工作机输出反馈',
  `OutputFeedbackOfMicroRaman` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '显微拉曼分析仪输出反馈',
  `OutputFeedbackOfMS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '质谱仪输出反馈',
  `OutputFeedbackOfALD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '声学定位输出反馈',
  `OutputFeedbackOfVDataIdNumeo1` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '摄像1的输出反馈',
  `OutputFeedbackOfVDataIdNumeo2` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '摄像2的输出反馈',
  `OutputFeedbackOfSwichBoard` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电交换机2输出反馈',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityoutputfeedback
-- ----------------------------

-- ----------------------------
-- Table structure for cavityoutputstatus
-- ----------------------------
DROP TABLE IF EXISTS `cavityoutputstatus`;
CREATE TABLE `cavityoutputstatus`  (
  `DataIdNum` int NOT NULL AUTO_INCREMENT COMMENT '数据编号',
  `RecordTime` datetime NULL DEFAULT NULL COMMENT '记录时间',
  `CavityPIN` int NULL DEFAULT NULL COMMENT '腔体识别码',
  `OutputStateOfGC-MS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '色质联用输出状态',
  `OutputStateOfSecondComPort1` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用串口1输出状态',
  `OutputStateOfSecondComPort2` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用串口2输出状态',
  `OutputStateOfOpticalComm` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '光通讯机输出状态',
  `OutputStateOfADCP` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'ADCP输出状态',
  `OutputStateOfCTD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT 'CTD输出状态',
  `OutputStateOfDC-ECD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '气相色谱仪输出状态',
  `OutputStateOfCH4` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '甲烷同位素分析仪状态',
  `OutputStateOfCo2` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '二氧化碳同位素分析仪状态',
  `OutputStateOfSNetPort` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '备用网口状态',
  `OutputStateOfSerialServer` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '串口服务器状态',
  `OutputStateOfIPC` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '工作机输出状态',
  `OutputStateOfMicroRaman` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '显微拉曼分析仪输出状态',
  `OutputStateOfMS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '质谱仪输出状态',
  `OutputStateOfALD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '声学定位输出状态',
  `OutputStateOfVDataIdNumeo1` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '摄像1的输出状态',
  `OutputStateOfVDataIdNumeo2` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '摄像2的输出状态',
  `OutputStateOfSwichBoard` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '电交换机2输出状态',
  PRIMARY KEY (`DataIdNum`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of cavityoutputstatus
-- ----------------------------

-- ----------------------------
-- Table structure for menus
-- ----------------------------
DROP TABLE IF EXISTS `menus`;
CREATE TABLE `menus`  (
  `menu_id` int NOT NULL COMMENT '菜单ID',
  `menu_header` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `target_view` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `parent_id` int NULL DEFAULT NULL,
  `menu_icon` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `_index` int NULL DEFAULT NULL,
  `menu_type` int NULL DEFAULT NULL,
  `state` int NULL DEFAULT NULL,
  PRIMARY KEY (`menu_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of menus
-- ----------------------------
INSERT INTO `menus` VALUES (1, '基础信息管理', NULL, 0, 'e6b8', 2, 1, 1);
INSERT INTO `menus` VALUES (2, '系统用户', 'UserManagementView', 1, 'e606', 1, 0, 1);
INSERT INTO `menus` VALUES (3, '用户角色', 'RoleView', 1, 'e600', 2, 0, 1);
INSERT INTO `menus` VALUES (4, '菜单管理', 'MenuManagementView', 1, 'e635', 0, 0, 1);

-- ----------------------------
-- Table structure for role_menu
-- ----------------------------
DROP TABLE IF EXISTS `role_menu`;
CREATE TABLE `role_menu`  (
  `role_id` int NOT NULL,
  `menu_id` int NOT NULL,
  PRIMARY KEY (`role_id`, `menu_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of role_menu
-- ----------------------------
INSERT INTO `role_menu` VALUES (1, 1);
INSERT INTO `role_menu` VALUES (1, 2);
INSERT INTO `role_menu` VALUES (1, 3);
INSERT INTO `role_menu` VALUES (1, 4);
INSERT INTO `role_menu` VALUES (1, 5);
INSERT INTO `role_menu` VALUES (1, 6);
INSERT INTO `role_menu` VALUES (1, 7);
INSERT INTO `role_menu` VALUES (1, 8);
INSERT INTO `role_menu` VALUES (1, 9);
INSERT INTO `role_menu` VALUES (1, 10);
INSERT INTO `role_menu` VALUES (1, 11);
INSERT INTO `role_menu` VALUES (1, 12);
INSERT INTO `role_menu` VALUES (1, 13);
INSERT INTO `role_menu` VALUES (1, 17);
INSERT INTO `role_menu` VALUES (1, 18);
INSERT INTO `role_menu` VALUES (1, 19);
INSERT INTO `role_menu` VALUES (1, 20);
INSERT INTO `role_menu` VALUES (1, 21);
INSERT INTO `role_menu` VALUES (1, 22);
INSERT INTO `role_menu` VALUES (1, 23);
INSERT INTO `role_menu` VALUES (1, 24);
INSERT INTO `role_menu` VALUES (1, 25);
INSERT INTO `role_menu` VALUES (2, 1);
INSERT INTO `role_menu` VALUES (2, 2);
INSERT INTO `role_menu` VALUES (2, 3);

-- ----------------------------
-- Table structure for role_user
-- ----------------------------
DROP TABLE IF EXISTS `role_user`;
CREATE TABLE `role_user`  (
  `user_id` int NOT NULL,
  `role_id` int NOT NULL,
  PRIMARY KEY (`role_id`, `user_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of role_user
-- ----------------------------
INSERT INTO `role_user` VALUES (2024001, 1);

-- ----------------------------
-- Table structure for sysrole
-- ----------------------------
DROP TABLE IF EXISTS `sysrole`;
CREATE TABLE `sysrole`  (
  `role_id` int NOT NULL AUTO_INCREMENT,
  `role_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `role_desc` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `state` int NULL DEFAULT NULL,
  PRIMARY KEY (`role_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of sysrole
-- ----------------------------
INSERT INTO `sysrole` VALUES (1, '测试权限组', '测试权限组测试权限组测试权限组测试权限组测试权限组', 1);

-- ----------------------------
-- Table structure for sysuser
-- ----------------------------
DROP TABLE IF EXISTS `sysuser`;
CREATE TABLE `sysuser`  (
  `UserId` int NOT NULL,
  `UserName` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `RealName` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Password` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Status` int NULL DEFAULT NULL,
  `Age` int NULL DEFAULT NULL,
  `UserIcon` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Phone` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Mobile` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Address` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Email` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `QQ` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `WeChat` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL,
  `Gender` int NULL DEFAULT NULL,
  `LastLoginTime` datetime NULL DEFAULT NULL,
  `CreateTime` datetime NULL DEFAULT NULL,
  `CreateId` int NULL DEFAULT NULL,
  `LastModifyTime` datetime NULL DEFAULT NULL,
  `LastModifyId` int NULL DEFAULT NULL,
  PRIMARY KEY (`UserId`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of sysuser
-- ----------------------------
INSERT INTO `sysuser` VALUES (2024001, 'admin', 'Administrator', '123456', 1, 26, 'a05.png', '1232342243322', NULL, '222', NULL, NULL, NULL, 0, NULL, '2024-02-28 13:49:33', 2024001, NULL, NULL);

SET FOREIGN_KEY_CHECKS = 1;
